0.00

0.10

0.20

0.30

0.40

0.50

0.60

0.70

0.80

0.90

1.00

6000 6500 7000 7500 8000 8500 9000

High voltage

Efficiency

Ar/Freon (35:57)

Ar/Freon (47:47)