12001400160018002000220024002600280030003200

19.7

19.8

19.9

20

20.1

20.2

TrayId:R2L1T2, Eta:11, Phi: 3

140016001800200022002400260028003000

18.65

18.7

18.75

18.8

18.85

18.9

18.95 19 19.05

TrayId:R2L1T2, Eta:12, Phi: 3

1600 1800 2000 2200 2400 2600 2800 19 19.05

19.1

19.15

19.2

19.25

19.3

19.35

TrayId:R2L1T2, Eta:13, Phi: 3

1600 1800 2000 2200 2400 2600

18.6

18.65

18.7

18.75

18.8

18.85

18.9

18.95

TrayId:R2L1T2, Eta:14, Phi: 3

1850 1900 1950 2000 2050 2100 2150 2200 2250

19.75

19.8

19.85

19.9

19.95 20 20.05

20.1

20.15

TrayId:R2L1T2, Eta:15, Phi: 3