1800 2000 2200 2400 2600 2800 3000 18

18.1

18.2

18.3

18.4

18.5

TrayId:R0L0T3, Eta: 1, Phi: 4

1600 1800 2000 2200 2400 2600 2800 3000 3200

20.5

20.6

20.7

20.8

20.9

21

TrayId:R0L0T3, Eta: 2, Phi: 4

1600 1800 2000 2200 2400 2600 2800 3000 3200

19.6

19.7

19.8

19.9

20

20.1

TrayId:R0L0T3, Eta: 3, Phi: 4

1600180020002200240026002800300032003400

19.1

19.2

19.3

19.4

19.5

19.6

19.7

TrayId:R0L0T3, Eta: 4, Phi: 4