signal11

Entries 2884 Mean 1.008 RMS 0.02989 / ndf

2χ 116.9 / 64 Constant 2.119± 93.6 Mean 0.0005842 ± 1.007 Sigma 0.0003804 ± 0.02964

Normalised HPD Signal

0.7 0.8 0.9 1 1.1 1.2 1.3 1.4 0 20 40 60 80 100 signal11

± ±

Laser Run No. 9537 HPD Signal, Spigot# 11 pinall

Entries 3998 Mean 0.9988 RMS 0.03858 / ndf

2χ 53.07 / 78 Constant 2.003±

97.3 Mean 0.0006516 ± 0.999 Sigma 0.0005064 ± 0.03823

Normalised ALL-PIN Signal

0.8 0.9 1 1.1 1.2 1.3 0 20 40 60 80 100 pinall

± ±

Laser Run No. 9537 All PIN Signal

hpdpin11

Entries 2884 Mean 1.004 RMS 0.02906 / ndf

2χ 106 / 76 Constant 2.91±

128.1 Mean 0.000557 ± 1.004 Sigma 0.0003687 ± 0.0289

0.5*(HPD + PIN)

0.8 0.9 1 1.1 1.2 1.3 1.4 0 20 40 60 80 100 120 140

± ±

Laser Run No. 9537 HPD Signal, Spigot# 11