0.8 0.85 0.9 0.95 1 1.05 1.1 1.15 1.2 1.25

-1

-0.5

0

0.5

1

Normalised HPD Vs. PIN Signal 9537

0.85 0.9 0.95 1 1.05 1.1 1.15

-0.4

-0.2 0 0.2 0.4 0.6 0.8 1 1.2 Normalised HPD Vs. PIN Signal 9538

0.9 0.95 1 1.05 1.1 0

0.2

0.4

0.6

0.8

1

1.2 Normalised HPD Vs. PIN Signal 9539

0.85 0.9 0.95 1 1.05 1.1 1.15 0.2

0.4

0.6

0.8

1

Normalised HPD Vs. PIN Signal 9540