signal1101

Entries 2976 Mean 36.99 RMS 3.49 / ndf

2χ 5.649 / 12 Constant 8.611±

358.3 Mean 0.07779 ± 36.79 Sigma 0.06333 ± 3.242

Signal (Ped. subtracted) Charge (fC)

25 30 35 40 45 50 55 0 50 100 150 200 250 300 350

± ±

Laser Run No. 9535 Signal, Spigot# 11-1 signal1101

Entries 2688 Mean 93.82 RMS 6.106 / ndf

2χ 26.24 / 21 Constant 5.007 ± 196.5 Mean 0.1295 ± 93.27 Sigma 0.106 ± 5.239

Signal (Ped. subtracted) Charge (fC)

70 80 90 100 110 120 0 20 40 60 80 100 120 140 160 180 200 220 signal1101

± ± ±

Laser Run No. 9537 Signal, Spigot# 11-1

signal1101

Entries 2865 Mean 277.9 RMS 12.99 / ndf

2χ 38.34 / 20 Constant 5.416±

219.4 Mean 0.2276 ± 274.9 Sigma 0.1614 ± 9.21

Signal (Ped. subtracted) Charge (fC)

240 260 280 300 320 340 0 20 40 60 80 100 120 140 160 180 200 220

± ±

Laser Run No. 9538 Signal, Spigot# 11-1 signal1101

Entries 2812 Mean 809.9 RMS 24.31 / ndf

2χ 53.49 / 38 Constant 3.085 ± 125.6 Mean 0.524 ± 807 Sigma 0.3819 ± 20.74

Signal (Ped. subtracted) Charge (fC)

750 800 850 900 950 0 20 40 60 80 100 120 140 signal1101

± ± ±

Laser Run No. 9539 Signal, Spigot# 11-1